-- phpMyAdmin SQL Dump
-- version 5.0.0-dev
-- https://www.phpmyadmin.net/
--
-- Počítač: 192.168.30.23
-- Vytvořeno: Pon 30. dub 2018, 20:31
-- Verze serveru: 8.0.3-rc-log
-- Verze PHP: 7.2.4-1+0~20180405085422.20+stretch~1.gbpbff9f0

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET AUTOCOMMIT = 0;
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Databáze: `CSV_DB`
--

-- --------------------------------------------------------

--
-- Struktura tabulky `table_name`
--

CREATE TABLE `table_name` (
  `sid` varchar(100) DEFAULT NULL,
  `itinerary_id` varchar(100) DEFAULT NULL,
  `adults` varchar(100) DEFAULT NULL,
  `advance_time` double DEFAULT NULL,
  `air_time` double DEFAULT NULL,
  `arr_back` double DEFAULT NULL,
  `arr_there` double DEFAULT NULL,
  `children` varchar(100) DEFAULT NULL,
  `currency` varchar(100) DEFAULT NULL,
  `dep_back` double DEFAULT NULL,
  `dep_there` double DEFAULT NULL,
  `distance` double DEFAULT NULL,
  `dst` varchar(100) DEFAULT NULL,
  `id` varchar(100) DEFAULT NULL,
  `infants` varchar(100) DEFAULT NULL,
  `locale` varchar(100) DEFAULT NULL,
  `nr_of_stopovers` double DEFAULT NULL,
  `partner` varchar(100) DEFAULT NULL,
  `passengers` double DEFAULT NULL,
  `price` double DEFAULT NULL,
  `rt_flight` varchar(100) DEFAULT NULL,
  `src` varchar(100) DEFAULT NULL,
  `stay_time` double DEFAULT NULL,
  `stopovers_time` double DEFAULT NULL,
  `timestamp_of_search` double DEFAULT NULL,
  `travel_time` double DEFAULT NULL,
  `booking` varchar(100) DEFAULT NULL,
  `click` varchar(100) DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

--
-- Vypisuji data pro tabulku `table_name`
--

INSERT INTO `table_name` (`sid`, `itinerary_id`, `adults`, `advance_time`, `air_time`, `arr_back`, `arr_there`, `children`, `currency`, `dep_back`, `dep_there`, `distance`, `dst`, `id`, `infants`, `locale`, `nr_of_stopovers`, `partner`, `passengers`, `price`, `rt_flight`, `src`, `stay_time`, `stopovers_time`, `timestamp_of_search`, `travel_time`, `booking`, `click`) VALUES
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296501149|296502791', '', 45.13325231481482, 14.25, 1488451800, 1488019800, '', 'eur', 1488352500, 1487967300, 4453.6, 'LPA', '295827072|303296948|296501149|296502791', '', 'ee', 2, '26b78', 3, 581, 'True', 'RIX', 3.8506944444444446, 36, 1484067787, 42.166666666666664, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296180976|296502791', '', 44.45616898148148, 14.166666666666668, 1488451800, 1487958600, '', 'eur', 1488366300, 1487908800, 4453.6, 'LPA', '295721641|295830044|296180976|296502791', '', 'ee', 2, '26b78', 3, 691, 'True', 'RIX', 4.71875, 31.416666666666664, 1484067787, 37.583333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296181464|296502791', '', 45.13325231481482, 14.166666666666668, 1488451800, 1488019800, '', 'eur', 1488388800, 1487967300, 4453.6, 'LPA', '295827072|303296948|296181464|296502791', '', 'ee', 2, '26b78', 3, 743, 'True', 'RIX', 4.270833333333333, 25.916666666666668, 1484067787, 32.083333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296204213|299958786', '', 45.13325231481482, 14.5, 1488455400, 1488019800, '', 'eur', 1488396300, 1487967300, 4453.6, 'LPA', '295827072|303296948|296204213|299958786', '', 'ee', 2, '26b78', 3, 754, 'True', 'RIX', 4.357638888888889, 23.916666666666668, 1484067787, 31, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296204213|299958786', '', 44.45616898148148, 14.5, 1488455400, 1487958600, '', 'eur', 1488396300, 1487908800, 4453.6, 'LPA', '295721641|295830044|296204213|299958786', '', 'ee', 2, '26b78', 3, 760, 'True', 'RIX', 5.065972222222222, 23.166666666666668, 1484067787, 30.25, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827068|295827305|296782426|296267084', '', 44.678391203703704, 14.416666666666668, 1488466800, 1487961900, '', 'eur', 1488396600, 1487928000, 4453.6, 'LPA', '295827068|295827305|296782426|296267084', '', 'ee', 2, '26b78', 3, 768, 'True', 'RIX', 5.03125, 20.75, 1484067787, 28.916666666666664, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296782426|296267084', '', 45.13325231481482, 14.416666666666668, 1488466800, 1488019800, '', 'eur', 1488396600, 1487967300, 4453.6, 'LPA', '295827072|303296948|296782426|296267084', '', 'ee', 2, '26b78', 3, 842, 'True', 'RIX', 4.361111111111111, 25.916666666666668, 1484067787, 34.083333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296782426|296267084', '', 44.45616898148148, 14.416666666666668, 1488466800, 1487958600, '', 'eur', 1488396600, 1487908800, 4453.6, 'LPA', '295721641|295830044|296782426|296267084', '', 'ee', 2, '26b78', 3, 848, 'True', 'RIX', 5.069444444444445, 25.166666666666668, 1484067787, 33.333333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295697354|295712774|296181464|296502791', '', 44.72700231481482, 13.75, 1488451800, 1487969100, '', 'eur', 1488388800, 1487932200, 4453.6, 'LPA', '295697354|295712774|296181464|296502791', '', 'ee', 2, '26b78', 3, 1006, 'True', 'RIX', 4.857638888888889, 20.75, 1484067787, 27.75, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295697354|295712774|296204213|299958786', '', 44.72700231481482, 14.083333333333332, 1488455400, 1487969100, '', 'eur', 1488396300, 1487932200, 4453.6, 'LPA', '295697354|295712774|296204213|299958786', '', 'ee', 2, '26b78', 3, 1017, 'True', 'RIX', 4.944444444444445, 18.75, 1484067787, 26.666666666666668, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|297917528|296267029', '', 45.13325231481482, 14.083333333333334, 1488446700, 1488019800, '', 'eur', 1488372300, 1487967300, 4453.6, 'LPA', '295827072|303296948|297917528|296267029', '', 'ee', 2, '26b78', 3, 1064, 'True', 'RIX', 4.079861111111111, 29.166666666666664, 1484067787, 35.25, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|297917528|296267029', '', 44.45616898148148, 14.083333333333334, 1488446700, 1487958600, '', 'eur', 1488372300, 1487908800, 4453.6, 'LPA', '295721641|295830044|297917528|296267029', '', 'ee', 2, '26b78', 3, 1070, 'True', 'RIX', 4.788194444444445, 28.416666666666664, 1484067787, 34.5, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296181036|BD1676585315_339245727', '', 45.13325231481482, 14.583333333333334, 1488398100, 1488019800, '', 'eur', 1488358200, 1487967300, 4453.6, 'LPA', '295827072|303296948|296181036|BD1676585315_339245727', '', 'ee', 2, '26b78', 3, 1070, 'True', 'RIX', 3.9166666666666665, 19.916666666666668, 1484067787, 25.666666666666668, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296181036|BD1676585315_339245727', '', 44.45616898148148, 14.583333333333334, 1488398100, 1487958600, '', 'eur', 1488358200, 1487908800, 4453.6, 'LPA', '295721641|295830044|296181036|BD1676585315_339245727', '', 'ee', 2, '26b78', 3, 1076, 'True', 'RIX', 4.625, 19.166666666666668, 1484067787, 24.916666666666668, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827068|295827305|296181402|298597003', '', 44.678391203703704, 14.5, 1488452700, 1487961900, '', 'eur', 1488389700, 1487928000, 4453.6, 'LPA', '295827068|295827305|296181402|298597003', '', 'ee', 2, '26b78', 3, 1138, 'True', 'RIX', 4.951388888888889, 19.916666666666668, 1484067787, 26.916666666666664, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB2429779955_335138930', '', 50.93490740740741, 1.9166666666666667, 0, 1488448800, '', 'EUR', 0, 1488441900, 1198.03, 'KRR', 'CB2429779955_335138930', '', 'ru', 0, '11567', 1, 40, 'False', 'SVO', 0, 0, 1484041124, 1.9166666666666667, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', '296270095', '', 51.108518518518515, 2, 0, 1488464100, '', 'EUR', 0, 1488456900, 1198.03, 'KRR', '296270095', '', 'ru', 0, '11567', 1, 51, 'False', 'DME', 0, 0, 1484041124, 2, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'DO2528832109_374940300', '', 50.486990740740744, 2, 0, 1488410400, '', 'EUR', 0, 1488403200, 1198.03, 'KRR', 'DO2528832109_374940300', '', 'ru', 0, '11567', 1, 54, 'False', 'VKO', 0, 0, 1484041124, 2, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'DO2528832084_374940313', '', 50.93837962962963, 2.1666666666666665, 0, 1488450000, '', 'EUR', 0, 1488442200, 1198.03, 'KRR', 'DO2528832084_374940313', '', 'ru', 0, '11567', 1, 54, 'False', 'VKO', 0, 0, 1484041124, 2.1666666666666665, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493159_325448569', '', 50.799490740740744, 2.25, 0, 1488438300, '', 'EUR', 0, 1488430200, 1198.03, 'KRR', 'CB1639493159_325448569', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.25, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493156_293296237', '', 50.49393518518519, 2.1666666666666665, 0, 1488411600, '', 'EUR', 0, 1488403800, 1198.03, 'KRR', 'CB1639493156_293296237', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.1666666666666665, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493158_325448568', '', 50.733518518518515, 2.1666666666666665, 0, 1488432300, '', 'EUR', 0, 1488424500, 1198.03, 'KRR', 'CB1639493158_325448568', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.1666666666666665, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1889902403_350718262', '', 51.40365740740741, 2.25, 0, 1488490500, '', 'EUR', 0, 1488482400, 1198.03, 'KRR', 'CB1889902403_350718262', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.25, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493157_325448570', '', 51.077268518518515, 2.25, 0, 1488462300, '', 'EUR', 0, 1488454200, 1198.03, 'KRR', 'CB1639493157_325448570', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.25, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW349749054_133448581|EW349749054_133115241', '', 50.82032407407407, 3.5, 0, 1488450000, '', 'EUR', 0, 1488432000, 1760.22, 'KRR', 'EW349749054_133448581|EW349749054_133115241', '', 'ru', 1, '11567', 1, 68, 'False', 'LED', 0, 2.8333333333333335, 1484041124, 5, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CI1698634831_330230577', '', 50.97657407407407, 2.3333333333333335, 0, 1488453900, '', 'EUR', 0, 1488445500, 1198.03, 'KRR', 'CI1698634831_330230577', '', 'ru', 0, '11567', 1, 77, 'False', 'DME', 0, 0, 1484041124, 2.3333333333333335, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CI1698634840_325518221', '', 50.83768518518519, 2.3333333333333335, 0, 1488441900, '', 'EUR', 0, 1488433500, 1198.03, 'KRR', 'CI1698634840_325518221', '', 'ru', 0, '11567', 1, 77, 'False', 'DME', 0, 0, 1484041124, 2.3333333333333335, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW350763285_133134800|EW350763285_111727613', '', 50.84462962962963, 3.5, 0, 1488449700, '', 'EUR', 0, 1488434100, 1760.22, 'KRR', 'EW350763285_133134800|EW350763285_111727613', '', 'ru', 1, '11567', 1, 78, 'False', 'LED', 0, 2.0833333333333335, 1484041124, 4.333333333333333, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW571980059_185543665', '', 50.80643518518519, 2.9166666666666665, 0, 1488441300, '', 'EUR', 0, 1488430800, 1760.22, 'KRR', 'EW571980059_185543665', '', 'ru', 0, '11567', 1, 78, 'False', 'LED', 0, 0, 1484041124, 2.9166666666666665, 'False', 'True'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW349749050_58598448|EW349749050_93623955', '', 50.66060185185185, 3.5, 0, 1488438300, '', 'EUR', 0, 1488418200, 1760.22, 'KRR', 'EW349749050_58598448|EW349749050_93623955', '', 'ru', 1, '11567', 1, 78, 'False', 'LED', 0, 3.3333333333333335, 1484041124, 5.583333333333333, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW350763283_69292867|EW350763283_131416414', '', 50.69532407407407, 3.75, 0, 1488441900, '', 'EUR', 0, 1488421200, 1760.22, 'KRR', 'EW350763283_69292867|EW350763283_131416414', '', 'ru', 1, '11567', 1, 84, 'False', 'LED', 0, 3.4166666666666665, 1484041124, 5.75, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', '308107276|299144743', '', 55.72547453703704, 2.933333333333333, 0, 1488890580, '', 'aud', 0, 1488852000, 128.66, 'PHL', '308107276|299144743', '', 'au', 1, '26b78', 2, 206, 'False', 'LGA', 0, 9.166666666666666, 1484037319, 10.716666666666667, 'False', 'True'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396228_296616373|EC1847396228_335294526', '', 55.10047453703704, 2.7666666666666666, 0, 1488813060, '', 'aud', 0, 1488798000, 128.66, 'PHL', 'EC1847396228_296616373|EC1847396228_335294526', '', 'au', 1, '26b78', 2, 273, 'False', 'LGA', 0, 2.5, 1484037319, 4.183333333333334, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396198_274788966|EC1847396198_277799188', '', 55.3921412037037, 2.9166666666666665, 0, 1488836460, '', 'aud', 0, 1488823200, 128.66, 'PHL', 'EC1847396198_274788966|EC1847396198_277799188', '', 'au', 1, '26b78', 2, 273, 'False', 'LGA', 0, 2, 1484037319, 3.683333333333333, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396209_274723654|EC1847396209_335792348', '', 55.55880787037037, 2.9833333333333334, 0, 1488851940, '', 'aud', 0, 1488837600, 128.66, 'PHL', 'EC1847396209_274723654|EC1847396209_335792348', '', 'au', 1, '26b78', 2, 273, 'False', 'LGA', 0, 2.4166666666666665, 1484037319, 3.9833333333333334, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EB1761262222_348814049|299094543', '', 55.20116898148148, 2.8, 0, 1488826560, '', 'aud', 0, 1488806700, 128.66, 'PHL', 'EB1761262222_348814049|299094543', '', 'au', 1, '26b78', 2, 283, 'False', 'EWR', 0, 3.9166666666666665, 1484037319, 5.516666666666667, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1886353231_304361873|EC1886353231_376413991', '', 55.2671412037037, 3, 0, 1488827040, '', 'aud', 0, 1488812400, 128.66, 'PHL', 'EC1886353231_304361873|EC1886353231_376413991', '', 'au', 1, '26b78', 2, 329, 'False', 'LGA', 0, 2.5, 1484037319, 4.066666666666666, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396246_331606289|EC1847396246_372944389', '', 55.12130787037037, 3.35, 0, 1488813480, '', 'aud', 0, 1488799800, 128.66, 'PHL', 'EC1847396246_331606289|EC1847396246_372944389', '', 'au', 1, '26b78', 2, 452, 'False', 'LGA', 0, 2.3333333333333335, 1484037319, 3.8, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1895643359_377355733', '', 55.48241898148148, 1.1833333333333333, 0, 1488835260, '', 'aud', 0, 1488831000, 128.66, 'PHL', 'EC1895643359_377355733', '', 'au', 0, '26b78', 2, 738, 'False', 'LGA', 0, 0, 1484037319, 1.1833333333333333, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1886353224_376876690', '', 55.12130787037037, 1.1166666666666667, 0, 1488803820, '', 'aud', 0, 1488799800, 128.66, 'PHL', 'EC1886353224_376876690', '', 'au', 0, '26b78', 2, 738, 'False', 'LGA', 0, 0, 1484037319, 1.1166666666666667, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', 'DH1906970692_229111763|DH1906970692_368375386|300581506', '', 5.7287384259259255, 14.666666666666666, 0, 1484619600, '', 'aud', 0, 1484523300, 10217.24, 'DEL', 'DH1906970692_229111763|DH1906970692_368375386|300581506', '', 'au', 2, '26b78', 1, 359, 'False', 'MEL', 0, 24.75, 1484028337, 26.75, 'False', 'True'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', '298500085|298493547|299653139', '', 5.79818287037037, 15.083333333333334, 0, 1484636400, '', 'aud', 0, 1484529300, 10217.24, 'DEL', '298500085|298493547|299653139', '', 'au', 2, '26b78', 1, 475, 'False', 'MEL', 0, 28.5, 1484028337, 29.75, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', '298500085|298493547|298294507', '', 5.79818287037037, 14.75, 0, 1484616300, '', 'aud', 0, 1484529300, 10217.24, 'DEL', '298500085|298493547|298294507', '', 'au', 2, '26b78', 1, 487, 'False', 'MEL', 0, 23.25, 1484028337, 24.166666666666668, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', '298500085|295422687', '', 5.79818287037037, 13.5, 0, 1484587800, '', 'aud', 0, 1484529300, 10217.24, 'DEL', '298500085|295422687', '', 'au', 1, '26b78', 1, 577, 'False', 'MEL', 0, 10.416666666666666, 1484028337, 16.25, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', 'EB1234096636_287577466', '', 5.73568287037037, 12.416666666666666, 0, 1484568600, '', 'aud', 0, 1484523900, 10217.24, 'DEL', 'EB1234096636_287577466', '', 'au', 0, '26b78', 1, 707, 'False', 'MEL', 0, 0, 1484028337, 12.416666666666666, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299476046|299398964', '', 83.84420138888889, 4.083333333333333, 0, 1491331800, '', 'gbp', 0, 1491309600, 589.34, 'LTN', '299476046|299398964', '', 'gb', 1, '26b78', 1, 38, 'False', 'HHN', 0, 3.6666666666666665, 1484065461, 6.166666666666667, 'False', 'True'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299476046|299904938', '', 83.84420138888889, 3.9166666666666665, 0, 1491343800, '', 'gbp', 0, 1491309600, 589.34, 'STN', '299476046|299904938', '', 'gb', 1, '26b78', 1, 39, 'False', 'HHN', 0, 7.166666666666667, 1484065461, 9.5, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '307581385|299519695', '', 84.09072916666666, 5.75, 0, 1491373500, '', 'gbp', 0, 1491330900, 589.34, 'LTN', '307581385|299519695', '', 'gb', 1, '26b78', 1, 44, 'False', 'HHN', 0, 8.416666666666666, 1484065461, 11.833333333333334, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299905280|299403947', '', 84.00045138888889, 4.5, 0, 1491348600, '', 'gbp', 0, 1491323100, 589.34, 'LGW', '299905280|299403947', '', 'gb', 1, '26b78', 1, 66, 'False', 'HHN', 0, 4.666666666666667, 1484065461, 7.083333333333333, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299905280|305137834', '', 84.00045138888889, 4.5, 0, 1491351600, '', 'gbp', 0, 1491323100, 589.34, 'LTN', '299905280|305137834', '', 'gb', 1, '26b78', 1, 75, 'False', 'HHN', 0, 5.5, 1484065461, 7.916666666666667, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299904324|299560054', '', 84.17059027777778, 3.3333333333333335, 0, 1491374700, '', 'gbp', 0, 1491337800, 589.34, 'LTN', '299904324|299560054', '', 'gb', 1, '26b78', 1, 96, 'False', 'HHN', 0, 8.833333333333334, 1484065461, 10.25, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', 'CH2883618935_357750281|CH2883618935_419949638', '', 83.6289236111111, 3.3333333333333335, 0, 1491307500, '', 'gbp', 0, 1491291000, 589.34, 'LHR', 'CH2883618935_357750281|CH2883618935_419949638', '', 'gb', 1, '26b78', 1, 122, 'False', 'FRA', 0, 2.5833333333333335, 1484065461, 4.583333333333333, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', 'DK18972348_3713744', '', 84.07336805555556, 1.5833333333333333, 0, 1491335100, '', 'gbp', 0, 1491329400, 589.34, 'LCY', 'DK18972348_3713744', '', 'gb', 0, '26b78', 1, 144, 'False', 'FRA', 0, 0, 1484065461, 1.5833333333333333, 'False', 'False'),
('126cad23-2eee-4c18-8028-6ba7b5731f7e', 'EI20851801_16475137|EI20851801_15695153|EI20851801_16475131', '', 12.708148148148148, 8.1, 0, 1485202500, '', 'cad', 0, 1485163800, 3546.59, 'YMM', 'EI20851801_16475137|EI20851801_15695153|EI20851801_16475131', '', 'ca', 2, '26b78', 1, 286, 'False', 'YHZ', 0, 9.583333333333334, 1484065816, 10.75, 'False', 'False'),
('126cad23-2eee-4c18-8028-6ba7b5731f7e', 'EI20851796_16475126|EI20851796_16475135|EI20851796_16475136', '', 12.83662037037037, 8.583333333333334, 0, 1485223800, '', 'cad', 0, 1485174900, 3546.59, 'YMM', 'EI20851796_16475126|EI20851796_16475135|EI20851796_16475136', '', 'ca', 2, '26b78', 1, 382, 'False', 'YHZ', 0, 11.916666666666666, 1484065816, 13.583333333333334, 'False', 'False'),
('126cad23-2eee-4c18-8028-6ba7b5731f7e', 'EI20851798_16475126|EI20851798_16475133|EI20851798_16475132', '', 12.83662037037037, 8.016666666666667, 0, 1485214800, '', 'cad', 0, 1485174900, 3546.59, 'YMM', 'EI20851798_16475126|EI20851798_16475133|EI20851798_16475132', '', 'ca', 2, '26b78', 1, 428, 'False', 'YHZ', 0, 9.916666666666666, 1484065816, 11.083333333333334, 'False', 'False'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', '300029398|294067814|306402107|293847036', '', 21.812349537037036, 15.25, 0, 1486021200, '', 'rub', 0, 1485896700, 9232.04, 'VKO', '300029398|294067814|306402107|293847036', '', 'ru', 3, '26b78', 1, 310, 'False', 'MIA', 0, 32, 1484012113, 34.583333333333336, 'False', 'False'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', '300029398|293817259', '', 21.812349537037036, 13, 0, 1485953400, '', 'rub', 0, 1485896700, 9232.04, 'DME', '300029398|293817259', '', 'ru', 1, '26b78', 1, 314, 'False', 'MIA', 0, 12.25, 1484012113, 15.75, 'False', 'True'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', 'CF2101099718_287432106|293764732|293847036', '', 21.857488425925926, 14.25, 0, 1486021200, '', 'rub', 0, 1485900600, 9232.04, 'VKO', 'CF2101099718_287432106|293764732|293847036', '', 'ru', 2, '26b78', 1, 442, 'False', 'MIA', 0, 30.916666666666668, 1484012113, 33.5, 'False', 'False'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', '300029398|DF2660124489_335165343|DF2660124489_335165344', '', 21.812349537037036, 13.583333333333334, 0, 1485958800, '', 'rub', 0, 1485896700, 9232.04, 'SVO', '300029398|DF2660124489_335165343|DF2660124489_335165344', '', 'ru', 2, '26b78', 1, 449, 'False', 'MIA', 0, 15.166666666666666, 1484012113, 17.25, 'False', 'False'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', '305405023|CG962374864_239017487', '', 21.437349537037036, 11.75, 0, 1485922200, '', 'rub', 0, 1485864300, 9232.04, 'SVO', '305405023|CG962374864_239017487', '', 'ru', 1, '26b78', 1, 466, 'False', 'MIA', 0, 7.333333333333333, 1484012113, 16.083333333333332, 'False', 'False'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', 'CC1760604866_293032471', '', 21.874849537037036, 11, 0, 1485941700, '', 'rub', 0, 1485902100, 9232.04, 'SVO', 'CC1760604866_293032471', '', 'ru', 0, '26b78', 1, 566, 'False', 'MIA', 0, 0, 1484012113, 11, 'False', 'False'),
('5db25589-a879-48e3-853c-8fb1a72e3d1a', 'CC1760604868_293032476|CC1760604868_287143897', '', 22.003321759259258, 12.333333333333334, 0, 1485963300, '', 'rub', 0, 1485913200, 9232.04, 'SVO', 'CC1760604868_293032476|CC1760604868_287143897', '', 'ru', 1, '26b78', 1, 791, 'False', 'MIA', 0, 10.083333333333334, 1484012113, 13.916666666666666, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '308099901', '1.0', 140.91199074074075, 1.25, 0, 1495469700, '0.0', 'EUR', 0, 1495465200, 559.45, 'SFO', '308099901', '0.0', 'missing', 0, 'ffa78', 1, 56, 'False', 'LAX', 0, 0, 1483290404, 1.25, 'False', 'True'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305766391', '1.0', 141.5161574074074, 1.3166666666666667, 0, 1495522140, '0.0', 'EUR', 0, 1495517400, 559.45, 'SFO', '305766391', '0.0', 'missing', 0, 'ffa78', 1, 56, 'False', 'LAX', 0, 0, 1483290404, 1.3166666666666667, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305766371', '1.0', 141.03699074074075, 1.4, 0, 1495481040, '0.0', 'EUR', 0, 1495476000, 559.45, 'SFO', '305766371', '0.0', 'missing', 0, 'ffa78', 1, 56, 'False', 'LAX', 0, 0, 1483290404, 1.4, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305766372', '1.0', 141.0786574074074, 1.3166666666666667, 0, 1495484340, '0.0', 'EUR', 0, 1495479600, 559.45, 'SFO', '305766372', '0.0', 'missing', 0, 'ffa78', 1, 56, 'False', 'LAX', 0, 0, 1483290404, 1.3166666666666667, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305766378', '1.0', 141.26962962962963, 1.1666666666666667, 0, 1495500300, '0.0', 'EUR', 0, 1495496100, 559.45, 'SFO', '305766378', '0.0', 'missing', 0, 'ffa78', 1, 56, 'False', 'LAX', 0, 0, 1483290404, 1.1666666666666667, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305766380', '1.0', 141.30782407407406, 1.2166666666666666, 0, 1495503780, '0.0', 'EUR', 0, 1495499400, 559.45, 'SFO', '305766380', '0.0', 'missing', 0, 'ffa78', 1, 56, 'False', 'LAX', 0, 0, 1483290404, 1.2166666666666666, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '306143478', '1.0', 141.28699074074075, 1.5, 0, 1495503000, '0.0', 'EUR', 0, 1495497600, 559.45, 'SFO', '306143478', '0.0', 'missing', 0, 'ffa78', 1, 65, 'False', 'LAX', 0, 0, 1483290404, 1.5, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '306143476', '1.0', 141.16199074074075, 1.5, 0, 1495492200, '0.0', 'EUR', 0, 1495486800, 559.45, 'SFO', '306143476', '0.0', 'missing', 0, 'ffa78', 1, 65, 'False', 'LAX', 0, 0, 1483290404, 1.5, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '306143480', '1.0', 141.37032407407406, 1.5, 0, 1495510200, '0.0', 'EUR', 0, 1495504800, 559.45, 'SFO', '306143480', '0.0', 'missing', 0, 'ffa78', 1, 65, 'False', 'LAX', 0, 0, 1483290404, 1.5, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '306143590', '1.0', 140.93282407407406, 1.3333333333333333, 0, 1495471800, '0.0', 'EUR', 0, 1495467000, 496.39, 'SJC', '306143590', '0.0', 'missing', 0, 'ffa78', 1, 65, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '306143592', '1.0', 141.09949074074075, 1.3, 0, 1495486080, '0.0', 'EUR', 0, 1495481400, 496.39, 'SJC', '306143592', '0.0', 'missing', 0, 'ffa78', 1, 65, 'False', 'LAX', 0, 0, 1483290404, 1.3, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '306143593', '1.0', 141.2661574074074, 1.2166666666666666, 0, 1495500180, '0.0', 'EUR', 0, 1495495800, 496.39, 'SJC', '306143593', '0.0', 'missing', 0, 'ffa78', 1, 65, 'False', 'LAX', 0, 0, 1483290404, 1.2166666666666666, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED2173419730_364615525', '1.0', 141.40157407407406, 1.3333333333333333, 0, 1495512300, '0.0', 'EUR', 0, 1495507500, 559.45, 'SFO', 'ED2173419730_364615525', '0.0', 'missing', 0, 'ffa78', 1, 80, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED2173419742_359022319', '1.0', 141.15851851851852, 1.4333333333333333, 0, 1495491660, '0.0', 'EUR', 0, 1495486500, 559.45, 'SFO', 'ED2173419742_359022319', '0.0', 'missing', 0, 'ffa78', 1, 80, 'False', 'LAX', 0, 0, 1483290404, 1.4333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED1846590537_317701957', '1.0', 141.3286574074074, 1.5, 0, 1495506600, '0.0', 'EUR', 0, 1495501200, 559.45, 'SFO', 'ED1846590537_317701957', '0.0', 'missing', 0, 'ffa78', 1, 81, 'False', 'LAX', 0, 0, 1483290404, 1.5, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'DD2631214389_413190487', '1.0', 141.0161574074074, 1.3833333333333333, 0, 1495479180, '0.0', 'EUR', 0, 1495474200, 496.39, 'SJC', 'DD2631214389_413190487', '0.0', 'missing', 0, 'ffa78', 1, 83, 'False', 'LAX', 0, 0, 1483290404, 1.3833333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'DD2631214390_413190486', '1.0', 141.18282407407406, 1.3333333333333333, 0, 1495493400, '0.0', 'EUR', 0, 1495488600, 496.39, 'SJC', 'DD2631214390_413190486', '0.0', 'missing', 0, 'ffa78', 1, 84, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'DD2511528479_379862008', '1.0', 141.34949074074075, 1.3166666666666667, 0, 1495507740, '0.0', 'EUR', 0, 1495503000, 496.39, 'SJC', 'DD2511528479_379862008', '0.0', 'missing', 0, 'ffa78', 1, 84, 'False', 'LAX', 0, 0, 1483290404, 1.3166666666666667, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED1846590558_327384332', '1.0', 141.12032407407406, 1.5, 0, 1495488600, '0.0', 'EUR', 0, 1495483200, 559.45, 'SFO', 'ED1846590558_327384332', '0.0', 'missing', 0, 'ffa78', 1, 84, 'False', 'LAX', 0, 0, 1483290404, 1.5, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305768169', '1.0', 141.40851851851852, 1.3333333333333333, 0, 1495512900, '0.0', 'EUR', 0, 1495508100, 559.45, 'SFO', '305768169', '0.0', 'missing', 0, 'ffa78', 1, 85, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305768170', '1.0', 141.45712962962963, 1.3333333333333333, 0, 1495517100, '0.0', 'EUR', 0, 1495512300, 559.45, 'SFO', '305768170', '0.0', 'missing', 0, 'ffa78', 1, 85, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '305768162', '1.0', 141.04393518518518, 1.3333333333333333, 0, 1495481400, '0.0', 'EUR', 0, 1495476600, 559.45, 'SFO', '305768162', '0.0', 'missing', 0, 'ffa78', 1, 85, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'DD2527080313_400766916', '1.0', 141.46060185185186, 1.1, 0, 1495516560, '0.0', 'EUR', 0, 1495512600, 496.39, 'SJC', 'DD2527080313_400766916', '0.0', 'missing', 0, 'ffa78', 1, 107, 'False', 'LAX', 0, 0, 1483290404, 1.1, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED1846590523_328103085', '1.0', 141.3911574074074, 1.3333333333333333, 0, 1495511400, '0.0', 'EUR', 0, 1495506600, 559.45, 'SFO', 'ED1846590523_328103085', '0.0', 'missing', 0, 'ffa78', 1, 123, 'False', 'LAX', 0, 0, 1483290404, 1.3333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED2173419734_384972607', '1.0', 141.46407407407406, 1.4, 0, 1495517940, '0.0', 'EUR', 0, 1495512900, 559.45, 'SFO', 'ED2173419734_384972607', '0.0', 'missing', 0, 'ffa78', 1, 123, 'False', 'LAX', 0, 0, 1483290404, 1.4, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED2173419739_384972602', '1.0', 140.97449074074075, 1.55, 0, 1495476180, '0.0', 'EUR', 0, 1495470600, 559.45, 'SFO', 'ED2173419739_384972602', '0.0', 'missing', 0, 'ffa78', 1, 153, 'False', 'LAX', 0, 0, 1483290404, 1.55, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED2173419732_384972606', '1.0', 140.9224074074074, 1.4333333333333333, 0, 1495471260, '0.0', 'EUR', 0, 1495466100, 559.45, 'SFO', 'ED2173419732_384972606', '0.0', 'missing', 0, 'ffa78', 1, 153, 'False', 'LAX', 0, 0, 1483290404, 1.4333333333333333, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'ED2173419737_384972605', '1.0', 141.21407407407406, 1.35, 0, 1495496160, '0.0', 'EUR', 0, 1495491300, 559.45, 'SFO', 'ED2173419737_384972605', '0.0', 'missing', 0, 'ffa78', 1, 153, 'False', 'LAX', 0, 0, 1483290404, 1.35, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', 'DD2527080302_401737313', '1.0', 140.90157407407406, 1.2, 0, 1495468620, '0.0', 'EUR', 0, 1495464300, 496.39, 'SJC', 'DD2527080302_401737313', '0.0', 'missing', 0, 'ffa78', 1, 268, 'False', 'LAX', 0, 0, 1483290404, 1.2, 'False', 'False'),
('225eabbc-2899-4696-9832-9ba5bc4c0664', '308094413|306486347', '1.0', 141.52657407407406, 2.533333333333333, 0, 1495547400, '0.0', 'EUR', 0, 1495518300, 559.45, 'SFO', '308094413|306486347', '0.0', 'missing', 1, 'ffa78', 1, 297, 'False', 'LAX', 0, 7.083333333333333, 1483290404, 8.083333333333334, 'False', 'False'),
('0d08bcda-c83e-42b8-83a9-261bd2a8c330', 'ED519068202_172328905|296504147|296293453|307744159', '1.0', 45.56099537037037, 16.233333333333334, 0, 1488551040, '0.0', 'USD', 0, 1488393000, 6624.86, 'PHL', 'ED519068202_172328905|296504147|296293453|307744159', '0.0', 'us', 3, '80a09', 1, 327, 'False', 'MUC', 0, 41.083333333333336, 1484456530, 43.9, 'False', 'True'),
('0d08bcda-c83e-42b8-83a9-261bd2a8c330', '296200260|296288702|296293453|307744159', '1.0', 45.571412037037035, 16.4, 0, 1488551040, '0.0', 'USD', 0, 1488393900, 6624.86, 'PHL', '296200260|296288702|296293453|307744159', '0.0', 'us', 3, '80a09', 1, 350, 'False', 'MUC', 0, 40.833333333333336, 1484456530, 43.65, 'False', 'False'),
('0d08bcda-c83e-42b8-83a9-261bd2a8c330', 'ED2585840167_283812202|ED2585840167_322144850|ED2585840167_431484965|ED2585840167_267411816', '1.0', 45.196412037037035, 10.416666666666666, 0, 1488418200, '0.0', 'USD', 0, 1488361500, 6624.86, 'PHL', 'ED2585840167_283812202|ED2585840167_322144850|ED2585840167_431484965|ED2585840167_267411816', '0.0', 'us', 1, '80a09', 1, 541, 'False', 'MUC', 0, 7.5, 1484456530, 15.75, 'False', 'False'),
('e326d6ca-5277-4c7c-8be6-c25cbbafad13', '299940677|299904254|EK193345148_91404632|300863081', '5.0', 74.3229861111111, 7.166666666666666, 1492323600, 1491656400, '0.0', 'GBP', 1492286100, 1491629100, 1140.34, 'GRO', '299940677|299904254|EK193345148_91404632|300863081', '0.0', 'gb', 2, '80a09', 5, 1134, 'True', 'LGW', 7.288194444444445, 15.166666666666666, 1485207594, 18, 'False', 'True'),
('e326d6ca-5277-4c7c-8be6-c25cbbafad13', '299940677|299904254|300619123|300653377', '5.0', 74.3229861111111, 9.083333333333332, 1492314600, 1491656400, '0.0', 'GBP', 1492261500, 1491629100, 1140.34, 'GRO', '299940677|299904254|300619123|300653377', '0.0', 'gb', 2, '80a09', 5, 1883, 'True', 'LGW', 7.003472222222222, 17.416666666666664, 1485207594, 22.333333333333332, 'False', 'False'),
('dd2ea589-dcfd-4da2-9cbe-0b459180375d', '295271749|308640328', '', 15.221006944444444, 3.9166666666666665, 0, 1486548000, '', 'sgd', 0, 1486522800, 1944.51, 'VII', '295271749|308640328', '', 'sg', 1, '26b78', 1, 91, 'False', 'SIN', 0, 5.166666666666667, 1485207705, 7, 'False', 'False'),
('dd2ea589-dcfd-4da2-9cbe-0b459180375d', '295271749|297770775', '', 15.221006944444444, 3.8333333333333335, 0, 1486547100, '', 'sgd', 0, 1486522800, 1944.51, 'VII', '295271749|297770775', '', 'sg', 1, '26b78', 1, 98, 'False', 'SIN', 0, 5, 1485207705, 6.75, 'False', 'False'),
('dd2ea589-dcfd-4da2-9cbe-0b459180375d', 'CG1967329840_372453627|307793006', '', 15.304340277777778, 3.9166666666666665, 0, 1486556400, '', 'sgd', 0, 1486530000, 1944.51, 'VII', 'CG1967329840_372453627|307793006', '', 'sg', 1, '26b78', 1, 125, 'False', 'SIN', 0, 5.5, 1485207705, 7.333333333333333, 'False', 'False'),
('dd2ea589-dcfd-4da2-9cbe-0b459180375d', 'CG1523656401_254781169|311475495', '', 15.613368055555556, 3.9166666666666665, 0, 1486602600, '', 'sgd', 0, 1486556700, 1944.51, 'VII', 'CG1523656401_254781169|311475495', '', 'sg', 1, '26b78', 1, 169, 'False', 'SIN', 0, 10.916666666666666, 1485207705, 12.75, 'False', 'False'),
('fa588300-9a49-4e8c-b587-c3fddd97bcb9', 'EQ1016921678_207089691|EQ1016921678_231684785|EU1007333402_243488559|EU1007333402_223201638', '1.0', 110.94133101851853, 11.233333333333334, 1495681920, 1494823080, '0.0', 'USD', 1495658100, 1494793200, 3286.83, 'YYC', 'EQ1016921678_207089691|EQ1016921678_231684785|EU1007333402_243488559|EU1007333402_223201638', '0.0', 'us', 2, '465aa', 1, 505, 'True', 'RDU', 9.664583333333333, 8.25, 1485207869, 14.916666666666668, 'False', 'True'),
('fa588300-9a49-4e8c-b587-c3fddd97bcb9', '308495710|308384817|305209680|EU595558548_185818816|EU595558548_178405671|EU595558548_192257249', '1.0', 111.1566087962963, 15.600000000000001, 1495650300, 1494894360, '0.0', 'USD', 1495607700, 1494811800, 3286.83, 'YYC', '308495710|308384817|305209680|EU595558548_185818816|EU595558548_178405671|EU595558548_192257249', '0.0', 'us', 4, '465aa', 1, 549, 'True', 'RDU', 8.25625, 29, 1485207869, 34.766666666666666, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296501149|296502791', '', 45.13325231481482, 14.25, 1488451800, 1488019800, '', 'eur', 1488352500, 1487967300, 4453.6, 'LPA', '295827072|303296948|296501149|296502791', '', 'ee', 2, '26b78', 3, 581, 'True', 'RIX', 3.8506944444444446, 36, 1484067787, 42.166666666666664, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296180976|296502791', '', 44.45616898148148, 14.166666666666668, 1488451800, 1487958600, '', 'eur', 1488366300, 1487908800, 4453.6, 'LPA', '295721641|295830044|296180976|296502791', '', 'ee', 2, '26b78', 3, 691, 'True', 'RIX', 4.71875, 31.416666666666664, 1484067787, 37.583333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296181464|296502791', '', 45.13325231481482, 14.166666666666668, 1488451800, 1488019800, '', 'eur', 1488388800, 1487967300, 4453.6, 'LPA', '295827072|303296948|296181464|296502791', '', 'ee', 2, '26b78', 3, 743, 'True', 'RIX', 4.270833333333333, 25.916666666666668, 1484067787, 32.083333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296204213|299958786', '', 45.13325231481482, 14.5, 1488455400, 1488019800, '', 'eur', 1488396300, 1487967300, 4453.6, 'LPA', '295827072|303296948|296204213|299958786', '', 'ee', 2, '26b78', 3, 754, 'True', 'RIX', 4.357638888888889, 23.916666666666668, 1484067787, 31, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296204213|299958786', '', 44.45616898148148, 14.5, 1488455400, 1487958600, '', 'eur', 1488396300, 1487908800, 4453.6, 'LPA', '295721641|295830044|296204213|299958786', '', 'ee', 2, '26b78', 3, 760, 'True', 'RIX', 5.065972222222222, 23.166666666666668, 1484067787, 30.25, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827068|295827305|296782426|296267084', '', 44.678391203703704, 14.416666666666668, 1488466800, 1487961900, '', 'eur', 1488396600, 1487928000, 4453.6, 'LPA', '295827068|295827305|296782426|296267084', '', 'ee', 2, '26b78', 3, 768, 'True', 'RIX', 5.03125, 20.75, 1484067787, 28.916666666666664, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296782426|296267084', '', 45.13325231481482, 14.416666666666668, 1488466800, 1488019800, '', 'eur', 1488396600, 1487967300, 4453.6, 'LPA', '295827072|303296948|296782426|296267084', '', 'ee', 2, '26b78', 3, 842, 'True', 'RIX', 4.361111111111111, 25.916666666666668, 1484067787, 34.083333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296782426|296267084', '', 44.45616898148148, 14.416666666666668, 1488466800, 1487958600, '', 'eur', 1488396600, 1487908800, 4453.6, 'LPA', '295721641|295830044|296782426|296267084', '', 'ee', 2, '26b78', 3, 848, 'True', 'RIX', 5.069444444444445, 25.166666666666668, 1484067787, 33.333333333333336, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295697354|295712774|296181464|296502791', '', 44.72700231481482, 13.75, 1488451800, 1487969100, '', 'eur', 1488388800, 1487932200, 4453.6, 'LPA', '295697354|295712774|296181464|296502791', '', 'ee', 2, '26b78', 3, 1006, 'True', 'RIX', 4.857638888888889, 20.75, 1484067787, 27.75, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295697354|295712774|296204213|299958786', '', 44.72700231481482, 14.083333333333332, 1488455400, 1487969100, '', 'eur', 1488396300, 1487932200, 4453.6, 'LPA', '295697354|295712774|296204213|299958786', '', 'ee', 2, '26b78', 3, 1017, 'True', 'RIX', 4.944444444444445, 18.75, 1484067787, 26.666666666666668, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|297917528|296267029', '', 45.13325231481482, 14.083333333333334, 1488446700, 1488019800, '', 'eur', 1488372300, 1487967300, 4453.6, 'LPA', '295827072|303296948|297917528|296267029', '', 'ee', 2, '26b78', 3, 1064, 'True', 'RIX', 4.079861111111111, 29.166666666666664, 1484067787, 35.25, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|297917528|296267029', '', 44.45616898148148, 14.083333333333334, 1488446700, 1487958600, '', 'eur', 1488372300, 1487908800, 4453.6, 'LPA', '295721641|295830044|297917528|296267029', '', 'ee', 2, '26b78', 3, 1070, 'True', 'RIX', 4.788194444444445, 28.416666666666664, 1484067787, 34.5, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827072|303296948|296181036|BD1676585315_339245727', '', 45.13325231481482, 14.583333333333334, 1488398100, 1488019800, '', 'eur', 1488358200, 1487967300, 4453.6, 'LPA', '295827072|303296948|296181036|BD1676585315_339245727', '', 'ee', 2, '26b78', 3, 1070, 'True', 'RIX', 3.9166666666666665, 19.916666666666668, 1484067787, 25.666666666666668, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295721641|295830044|296181036|BD1676585315_339245727', '', 44.45616898148148, 14.583333333333334, 1488398100, 1487958600, '', 'eur', 1488358200, 1487908800, 4453.6, 'LPA', '295721641|295830044|296181036|BD1676585315_339245727', '', 'ee', 2, '26b78', 3, 1076, 'True', 'RIX', 4.625, 19.166666666666668, 1484067787, 24.916666666666668, 'False', 'False'),
('91246002-ea8a-41ac-8766-b9806f65d210', '295827068|295827305|296181402|298597003', '', 44.678391203703704, 14.5, 1488452700, 1487961900, '', 'eur', 1488389700, 1487928000, 4453.6, 'LPA', '295827068|295827305|296181402|298597003', '', 'ee', 2, '26b78', 3, 1138, 'True', 'RIX', 4.951388888888889, 19.916666666666668, 1484067787, 26.916666666666664, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB2429779955_335138930', '', 50.93490740740741, 1.9166666666666667, 0, 1488448800, '', 'EUR', 0, 1488441900, 1198.03, 'KRR', 'CB2429779955_335138930', '', 'ru', 0, '11567', 1, 40, 'False', 'SVO', 0, 0, 1484041124, 1.9166666666666667, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', '296270095', '', 51.108518518518515, 2, 0, 1488464100, '', 'EUR', 0, 1488456900, 1198.03, 'KRR', '296270095', '', 'ru', 0, '11567', 1, 51, 'False', 'DME', 0, 0, 1484041124, 2, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'DO2528832109_374940300', '', 50.486990740740744, 2, 0, 1488410400, '', 'EUR', 0, 1488403200, 1198.03, 'KRR', 'DO2528832109_374940300', '', 'ru', 0, '11567', 1, 54, 'False', 'VKO', 0, 0, 1484041124, 2, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'DO2528832084_374940313', '', 50.93837962962963, 2.1666666666666665, 0, 1488450000, '', 'EUR', 0, 1488442200, 1198.03, 'KRR', 'DO2528832084_374940313', '', 'ru', 0, '11567', 1, 54, 'False', 'VKO', 0, 0, 1484041124, 2.1666666666666665, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493159_325448569', '', 50.799490740740744, 2.25, 0, 1488438300, '', 'EUR', 0, 1488430200, 1198.03, 'KRR', 'CB1639493159_325448569', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.25, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493156_293296237', '', 50.49393518518519, 2.1666666666666665, 0, 1488411600, '', 'EUR', 0, 1488403800, 1198.03, 'KRR', 'CB1639493156_293296237', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.1666666666666665, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493158_325448568', '', 50.733518518518515, 2.1666666666666665, 0, 1488432300, '', 'EUR', 0, 1488424500, 1198.03, 'KRR', 'CB1639493158_325448568', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.1666666666666665, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1889902403_350718262', '', 51.40365740740741, 2.25, 0, 1488490500, '', 'EUR', 0, 1488482400, 1198.03, 'KRR', 'CB1889902403_350718262', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.25, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CB1639493157_325448570', '', 51.077268518518515, 2.25, 0, 1488462300, '', 'EUR', 0, 1488454200, 1198.03, 'KRR', 'CB1639493157_325448570', '', 'ru', 0, '11567', 1, 57, 'False', 'SVO', 0, 0, 1484041124, 2.25, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW349749054_133448581|EW349749054_133115241', '', 50.82032407407407, 3.5, 0, 1488450000, '', 'EUR', 0, 1488432000, 1760.22, 'KRR', 'EW349749054_133448581|EW349749054_133115241', '', 'ru', 1, '11567', 1, 68, 'False', 'LED', 0, 2.8333333333333335, 1484041124, 5, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CI1698634831_330230577', '', 50.97657407407407, 2.3333333333333335, 0, 1488453900, '', 'EUR', 0, 1488445500, 1198.03, 'KRR', 'CI1698634831_330230577', '', 'ru', 0, '11567', 1, 77, 'False', 'DME', 0, 0, 1484041124, 2.3333333333333335, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'CI1698634840_325518221', '', 50.83768518518519, 2.3333333333333335, 0, 1488441900, '', 'EUR', 0, 1488433500, 1198.03, 'KRR', 'CI1698634840_325518221', '', 'ru', 0, '11567', 1, 77, 'False', 'DME', 0, 0, 1484041124, 2.3333333333333335, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW350763285_133134800|EW350763285_111727613', '', 50.84462962962963, 3.5, 0, 1488449700, '', 'EUR', 0, 1488434100, 1760.22, 'KRR', 'EW350763285_133134800|EW350763285_111727613', '', 'ru', 1, '11567', 1, 78, 'False', 'LED', 0, 2.0833333333333335, 1484041124, 4.333333333333333, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW571980059_185543665', '', 50.80643518518519, 2.9166666666666665, 0, 1488441300, '', 'EUR', 0, 1488430800, 1760.22, 'KRR', 'EW571980059_185543665', '', 'ru', 0, '11567', 1, 78, 'False', 'LED', 0, 0, 1484041124, 2.9166666666666665, 'False', 'True'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW349749050_58598448|EW349749050_93623955', '', 50.66060185185185, 3.5, 0, 1488438300, '', 'EUR', 0, 1488418200, 1760.22, 'KRR', 'EW349749050_58598448|EW349749050_93623955', '', 'ru', 1, '11567', 1, 78, 'False', 'LED', 0, 3.3333333333333335, 1484041124, 5.583333333333333, 'False', 'False'),
('3365d0c8-b883-47e9-a7ea-d5e39630eb8d', 'EW350763283_69292867|EW350763283_131416414', '', 50.69532407407407, 3.75, 0, 1488441900, '', 'EUR', 0, 1488421200, 1760.22, 'KRR', 'EW350763283_69292867|EW350763283_131416414', '', 'ru', 1, '11567', 1, 84, 'False', 'LED', 0, 3.4166666666666665, 1484041124, 5.75, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', '308107276|299144743', '', 55.72547453703704, 2.933333333333333, 0, 1488890580, '', 'aud', 0, 1488852000, 128.66, 'PHL', '308107276|299144743', '', 'au', 1, '26b78', 2, 206, 'False', 'LGA', 0, 9.166666666666666, 1484037319, 10.716666666666667, 'False', 'True'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396228_296616373|EC1847396228_335294526', '', 55.10047453703704, 2.7666666666666666, 0, 1488813060, '', 'aud', 0, 1488798000, 128.66, 'PHL', 'EC1847396228_296616373|EC1847396228_335294526', '', 'au', 1, '26b78', 2, 273, 'False', 'LGA', 0, 2.5, 1484037319, 4.183333333333334, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396198_274788966|EC1847396198_277799188', '', 55.3921412037037, 2.9166666666666665, 0, 1488836460, '', 'aud', 0, 1488823200, 128.66, 'PHL', 'EC1847396198_274788966|EC1847396198_277799188', '', 'au', 1, '26b78', 2, 273, 'False', 'LGA', 0, 2, 1484037319, 3.683333333333333, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396209_274723654|EC1847396209_335792348', '', 55.55880787037037, 2.9833333333333334, 0, 1488851940, '', 'aud', 0, 1488837600, 128.66, 'PHL', 'EC1847396209_274723654|EC1847396209_335792348', '', 'au', 1, '26b78', 2, 273, 'False', 'LGA', 0, 2.4166666666666665, 1484037319, 3.9833333333333334, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EB1761262222_348814049|299094543', '', 55.20116898148148, 2.8, 0, 1488826560, '', 'aud', 0, 1488806700, 128.66, 'PHL', 'EB1761262222_348814049|299094543', '', 'au', 1, '26b78', 2, 283, 'False', 'EWR', 0, 3.9166666666666665, 1484037319, 5.516666666666667, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1886353231_304361873|EC1886353231_376413991', '', 55.2671412037037, 3, 0, 1488827040, '', 'aud', 0, 1488812400, 128.66, 'PHL', 'EC1886353231_304361873|EC1886353231_376413991', '', 'au', 1, '26b78', 2, 329, 'False', 'LGA', 0, 2.5, 1484037319, 4.066666666666666, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1847396246_331606289|EC1847396246_372944389', '', 55.12130787037037, 3.35, 0, 1488813480, '', 'aud', 0, 1488799800, 128.66, 'PHL', 'EC1847396246_331606289|EC1847396246_372944389', '', 'au', 1, '26b78', 2, 452, 'False', 'LGA', 0, 2.3333333333333335, 1484037319, 3.8, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1895643359_377355733', '', 55.48241898148148, 1.1833333333333333, 0, 1488835260, '', 'aud', 0, 1488831000, 128.66, 'PHL', 'EC1895643359_377355733', '', 'au', 0, '26b78', 2, 738, 'False', 'LGA', 0, 0, 1484037319, 1.1833333333333333, 'False', 'False'),
('fe51dbee-7eaf-4a6c-8c52-8e8dcfb2a422', 'EC1886353224_376876690', '', 55.12130787037037, 1.1166666666666667, 0, 1488803820, '', 'aud', 0, 1488799800, 128.66, 'PHL', 'EC1886353224_376876690', '', 'au', 0, '26b78', 2, 738, 'False', 'LGA', 0, 0, 1484037319, 1.1166666666666667, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', 'DH1906970692_229111763|DH1906970692_368375386|300581506', '', 5.7287384259259255, 14.666666666666666, 0, 1484619600, '', 'aud', 0, 1484523300, 10217.24, 'DEL', 'DH1906970692_229111763|DH1906970692_368375386|300581506', '', 'au', 2, '26b78', 1, 359, 'False', 'MEL', 0, 24.75, 1484028337, 26.75, 'False', 'True'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', '298500085|298493547|299653139', '', 5.79818287037037, 15.083333333333334, 0, 1484636400, '', 'aud', 0, 1484529300, 10217.24, 'DEL', '298500085|298493547|299653139', '', 'au', 2, '26b78', 1, 475, 'False', 'MEL', 0, 28.5, 1484028337, 29.75, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', '298500085|298493547|298294507', '', 5.79818287037037, 14.75, 0, 1484616300, '', 'aud', 0, 1484529300, 10217.24, 'DEL', '298500085|298493547|298294507', '', 'au', 2, '26b78', 1, 487, 'False', 'MEL', 0, 23.25, 1484028337, 24.166666666666668, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', '298500085|295422687', '', 5.79818287037037, 13.5, 0, 1484587800, '', 'aud', 0, 1484529300, 10217.24, 'DEL', '298500085|295422687', '', 'au', 1, '26b78', 1, 577, 'False', 'MEL', 0, 10.416666666666666, 1484028337, 16.25, 'False', 'False'),
('12b45893-3144-40d1-8f26-6d4a52cc6134', 'EB1234096636_287577466', '', 5.73568287037037, 12.416666666666666, 0, 1484568600, '', 'aud', 0, 1484523900, 10217.24, 'DEL', 'EB1234096636_287577466', '', 'au', 0, '26b78', 1, 707, 'False', 'MEL', 0, 0, 1484028337, 12.416666666666666, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299476046|299398964', '', 83.84420138888889, 4.083333333333333, 0, 1491331800, '', 'gbp', 0, 1491309600, 589.34, 'LTN', '299476046|299398964', '', 'gb', 1, '26b78', 1, 38, 'False', 'HHN', 0, 3.6666666666666665, 1484065461, 6.166666666666667, 'False', 'True'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299476046|299904938', '', 83.84420138888889, 3.9166666666666665, 0, 1491343800, '', 'gbp', 0, 1491309600, 589.34, 'STN', '299476046|299904938', '', 'gb', 1, '26b78', 1, 39, 'False', 'HHN', 0, 7.166666666666667, 1484065461, 9.5, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '307581385|299519695', '', 84.09072916666666, 5.75, 0, 1491373500, '', 'gbp', 0, 1491330900, 589.34, 'LTN', '307581385|299519695', '', 'gb', 1, '26b78', 1, 44, 'False', 'HHN', 0, 8.416666666666666, 1484065461, 11.833333333333334, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299905280|299403947', '', 84.00045138888889, 4.5, 0, 1491348600, '', 'gbp', 0, 1491323100, 589.34, 'LGW', '299905280|299403947', '', 'gb', 1, '26b78', 1, 66, 'False', 'HHN', 0, 4.666666666666667, 1484065461, 7.083333333333333, 'False', 'False'),
('726c0591-84c4-4af4-a9ba-edc30c302d88', '299905280|305137834', '', 84.00045138888889, 4.5, 0, 1491351600, '', 'gbp', 0, 1491323100, 589.34, 'LTN', '299905280|305137834', '', 'gb', 1, '26b78', 1, 75, 'False', 'HHN', 0, 5.5, 1484065461, 7.916666666666667, 'False', 'False');
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
